f_{RJ}(λ) = \frac{8πkT}{λ^{4}}

f_{W}(λ) = C_{1}λ^{−5}e^{−C_{2}/λT}

f_{P}(λ) = \frac{8πhcλ^{−5}}{e^{hc/λkT} − 1}